-- phpMyAdmin SQL Dump
-- Erstellungszeit: 18. Mrz 2013 um 04:21
-- Server-Version: 5.5.27
--
SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";
-- --------------------------------------------------------
-- Database structure for WebsiteBaker core
--
-- Replacements: {TABLE_PREFIX}, {TABLE_ENGINE}, {TABLE_COLLATION}
--
-- --------------------------------------------------------
--
-- Daten für Tabelle `mod_captcha_control`
--

INSERT INTO `{TABLE_PREFIX}mod_captcha_control` VALUES(1, '1', 'calc_ttf_image', 20, 10, 5, '');
-- EndOfFile